\frac{1-tan\left(90^{\circ} +\alpha \right)}{1+cot\left(360^{\circ} -\alpha \right)}=
\frac{1+tan\left(180^{\circ} +\alpha \right)}{cot\left(270^{\circ} -\alpha \right)-1}