{cos}^{2}\left(\alpha-90^{\circ}  \right)+cot\left(\alpha-270^{\circ}  \right)=
\frac{1}{{sin}^{2}\left(\alpha+90^{\circ}  \right)}-{cos}^{2}\left(\alpha+180^{\circ} \right)